-- 企业微信租户配置表
CREATE TABLE IF NOT EXISTS `wecom_tenant_config` (
  `id`              BIGINT NOT NULL AUTO_INCREMENT,
  `tenant_id`       VARCHAR(20) NOT NULL COMMENT '租户ID',
  `corpid`          VARCHAR(64) NOT NULL COMMENT '企业微信企业ID',
  `corpsecret`      VARCHAR(128) NOT NULL COMMENT '企业微信应用密钥',
  `agent_id`        VARCHAR(64) DEFAULT NULL COMMENT '应用AgentID',
  `callback_token`  VARCHAR(128) DEFAULT NULL COMMENT '回调Token',
  `callback_aes_key` VARCHAR(128) DEFAULT NULL COMMENT '回调EncodingAESKey',
  `enabled`         CHAR(1) DEFAULT '0' COMMENT '是否启用(0否 1是)',
  `remark`          VARCHAR(500) DEFAULT NULL COMMENT '备注',
  `create_time`     DATETIME DEFAULT CURRENT_TIMESTAMP,
  `update_time`     DATETIME DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_tenant_id` (`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='企业微信租户配置';
